! Generated automatically by mantohlp
1 xpdf

       xpdf - Portable Document Format (PDF) file viewer for X (version 3.02)

       xpdf [options] [PDF-file [page | +dest]]

       Xpdf  is a viewer for Portable Document Format (PDF) files.  (These are
       also sometimes also called 'Acrobat' files, from the  name  of  Adobe's
       PDF  software.)   Xpdf runs under the X Window System on UNIX, VMS, and
       OS/2.

       To run xpdf, simply type:

              xpdf file.pdf

       where file.pdf is your PDF file.  The file name can be  followed  by  a
       number specifying the page which should be displayed first, e.g.:

              xpdf file.pdf 18

       You  can  also  give a named destination, prefixed with '+' in place of
       the page number.  (This is only useful  with  PDF  files  that  provide
       named destination targets.)

       You can also start xpdf without opening any files:

              xpdf

                                                                            ()

2 ONFIGURATION_FIL

       Xpdf reads a configuration file at startup.  It first tries to find the
       user's private config file, ~/.xpdfrc.  If that doesn't exist, it looks
       for  a  system-wide  config  file, typically /usr/local/etc/xpdfrc (but
       this location can be changed when xpdf is built).   See  the  xpdfrc(5)
       man page for details.

                                                                            ()

2 OPTIONS

       Many  of  the following options can be set with configuration file com-
       mands or X resources.  These are listed in  square  brackets  with  the
       description of the corresponding command line option.

       -g geometry
              Set the initial window geometry.  (-geometry is equivalent.)  [X
              resource: xpdf.geometry]

       -title title
              Set the window title.  By default,  the  title  will  be  "xpdf:
              foo.pdf".  [X resource: xpdf.title]

       -cmap  Install  a private colormap.  This is ignored on TrueColor visu-
              als.  [X resource: xpdf.installCmap]

       -rgb number
              Set the size of largest RGB cube xpdf will try to allocate.  The
              default is 5 (for a 5x5x5 cube); set to a smaller number to con-
              serve color table entries.  This is ignored  with  private  col-
              ormaps and on TrueColor visuals.  [X resource: xpdf.rgbCubeSize]

       -rv    Set reverse video mode.  This reverses the colors of  everything
              except  images.  It may not always produce great results for PDF
              files which do weird things with color.  This  also  causes  the
              paper  color  to  default to black.  [X resource: xpdf.reverseV-
              ideo]

       -papercolor color
              Set the "paper color", i.e., the background of the page display.
              This  will  not work too well with PDF files that do things like
              filling in white behind the text.  [X resource: xpdf.paperColor]

       -mattecolor color
              Set the matte color, i.e., the color used for background outside
              the  actual  page  area.   (There   is   a   separate   setting,
              xpdf.fullScreenMatteColor,  for full-screen mode.)  [X resource:
              xpdf.matteColor]

       -z zoom
              Set the initial zoom factor.  A number specifies a zoom percent-
              age,  where 100 means 72 dpi.You may also specify 'page', to fit
              the page to the window size, or 'width', to fit the  page  width
              to  the window width.  [config file: initialZoom; or X resource:
              xpdf.initialZoom]

       -cont  Start in continuous view mode, i.e., with  one  vertical  scroll
              bar for the whole document.  [config file: continuousView]

       -t1lib yes | no
              Enable  or  disable  t1lib  (a  Type  1  font rasterizer).  This
              defaults to "yes".  [config file: enableT1lib]

       -freetype yes | no
              Enable or disable FreeType (a TrueType /  Type  1  font  raster-
              izer).  This defaults to "yes".  [config file: enableFreeType]

       -aa yes | no
              Enable  or  disable font anti-aliasing.  This defaults to "yes".
              [config file: antialias]

       -aaVector yes | no
              Enable or disable vector anti-aliasing.  This defaults to "yes".
              [config file: vectorAntialias]

       -ps PS-file
              Set  the default file name for PostScript output (i.e., the name
              which will appear in the print dialog).  This can also be of the
              form '|command' to pipe the PostScript through a command.  [con-
              fig file: psFile]

       -paper size
              Set the paper size to one of "letter", "legal", "A4",  or  "A3".
              This  can  also be set to "match", which will set the paper size
              to match the size specified in  the  PDF  file.   [config  file:
              psPaperSize]

       -paperw size
              Set the paper width, in points.  [config file: psPaperSize]

       -paperh size
              Set the paper height, in points.  [config file: psPaperSize]

       -level1
              Generate  Level  1  PostScript.   The resulting PostScript files
              will be significantly larger (if they contain images), but  will
              print  on  Level  1  printers.  This also converts all images to
              black and white.  [config file: psLevel]

       -enc encoding-name
              Sets the encoding to use for  text  output.   The  encoding-name
              must  be  defined  with  the unicodeMap command (see xpdfrc(5)).
              This defaults to "Latin1" (which is a built-in encoding).  [con-
              fig file: textEncoding]

       -eol unix | dos | mac
              Sets the end-of-line convention to use for text output.  [config
              file: textEOL]

       -opw password
              Specify the owner password for the  PDF  file.   Providing  this
              will bypass all security restrictions.

       -upw password
              Specify the user password for the PDF file.

       -fullscreen
              Open xpdf in full-screen mode, useful for presentations.

       -remote name
              Start/contact  xpdf  remote  server with specified name (see the
              REMOTE SERVER MODE section below).

       -exec command
              Execute a command (see the COMMANDS section below)  in  an  xpdf
              remote server window (with -remote only).

       -reload
              Reload xpdf remote server window (with -remote only).

       -raise Raise xpdf remote server window (with -remote only).

       -quit  Kill xpdf remote server (with -remote only).

       -cmd   Print  commands  as  they're  executed  (useful  for debugging).
              [config file: printCommands]

       -q     Don't print any messages or errors.  [config file: errQuiet]

       -cfg config-file
              Read config-file in place of ~/.xpdfrc or the system-wide config
              file.

       -v     Print copyright and version information.

       -h     Print usage information.  (-help and --help are equivalent.)

       Several other standard X options and resources will work as expected:

       -display display
              [X resource: xpdf.display]

       -fg color
              (-foreground is equivalent.)  [X resource: xpdf*Foreground]

       -bg color
              (-background is equivalent.)  [X resource: xpdf*Background]

       -font font
              (-fn is equivalent.)  [X resource: xpdf*fontList]

       The color and font options only affect the user interface elements, not
       the PDF display (the 'paper').

       The following X resources do not have command line option equivalents:

       xpdf.toolTipEnable
              Enables (if set to true) or disables (if set to false) the tool-
              tips on the toolbar buttons.

       xpdf.fullScreenMatteColor
              Sets  the  matte  color  to  be  used  in full-screen mode.  The
              default setting is "black".

                                                                            ()

2 CONTROLS

   On-screen controls, at the bottom of the xpdf window
       left/right arrow buttons
              Move to the previous/next page.

       double left/right arrow buttons
              Move backward or forward by ten pages.

       dashed left/right arrow buttons
              Move backward or forward along the history path.

       'Page' entry box
              Move  to  a  specific page number.  Click in the box to activate
              it, type the page number, then hit return.

       zoom popup menu
              Change the zoom factor (see the description  of  the  -z  option
              above).

       binoculars button
              Find a text string.

       print button
              Bring  up a dialog for generating a PostScript file.  The dialog
              has options to set the pages to be printed  and  the  PostScript
              file name.  The file name can be '-' for stdout or '|command' to
              pipe the PostScript through a command, e.g., '|lpr'.

       '?' button
              Bring up the 'about xpdf' window.

       link info
              The space between the '?' and 'Quit' buttons is used to show the
              URL or external file name when the mouse is over a link.

       'Quit' button
              Quit xpdf.

   Menu
       Pressing the right mouse button will post a popup menu with the follow-
       ing commands:

       Open...
              Open a new PDF file via a file requester.

       Open in new window...
              Create a new  window  and  open  a  new  PDF  file  via  a  file
              requester.

       Reload Reload  the  current  PDF  file.  Note that Xpdf will reload the
              file automatically (on a  page  change  or  redraw)  if  it  has
              changed since it was last loaded.

       Save as...
              Save the current file via a file requester.

       Continuous view
              Toggles between single page and continuous view modes.

       Rotate counterclockwise
              Rotate the page 90 degrees counterclockwise.

       Rotate clockwise
              Rotate  the  page 90 degrees clockwise.  The two rotate commands
              are intended primarily for PDF files where  the  rotation  isn't
              correctly specified in the file.

       Zoom to selection
              Zoom in to the currently selected rectangle.

       Close  Close  the current window.  If this is the only open window, the
              document is closed, but the window is left open (i.e., this menu
              command won't quit xpdf).

       Quit   Quit xpdf.

   Outline
       If  the  PDF  contains an outline (a.k.a., bookmarks), there will be an
       outline pane on the left side of the window.  The width of the  outline
       pane is adjustable with a vertical split bar via the knob near its bot-
       tom end.

   Text selection
       Dragging the mouse with the left button held  down  will  highlight  an
       arbitrary  rectangle.  Any text inside this rectangle will be copied to
       the X selection buffer.

   Links
       Clicking on a hyperlink will jump to the link's destination.  A link to
       another  PDF  document  will  make xpdf load that document.  A 'launch'
       link to an executable program will display a dialog, and if  you  click
       'ok', execute the program.  URL links call an external command (see the
       WEB BROWSERS section below).

   Panning
       Dragging the mouse with the middle button held down pans the window.

   Key bindings
       o      Open a new PDF file via a file requester.

       r      Reload the current PDF file.  Note that  Xpdf  will  reload  the
              file  automatically  (on  a  page  change  or  redraw) if it has
              changed since it was last loaded.

       control-L
              Redraw the current page.

       control-W
              Close the current window.

       f or control-F
              Find a text string.

       control-G
              Find next occurrence.

       control-P
              Print.

       n      Move to the next page.  Scrolls to the top of the  page,  unless
              scroll lock is turned on.

       p      Move  to  the  previous  page.   Scrolls to the top of the page,
              unless scroll lock is turned on.

       <Space> or <PageDown> or <Next>
              Scroll down on the current page; if already at bottom,  move  to
              next page.

       <Backspace> or <Delete> or <PageUp> or <Previous>
              Scroll up on the current page; if already at top, move to previ-
              ous page.

       v      Move forward along the history path.

       b      Move backward along the history path.

       <Home> Scroll to top of current page.

       <End>  Scroll to bottom of current page.

       control-<Home>
              Scroll to first page of document.

       control-<End>
              Scroll to last page of document.

       arrows Scroll the current page.

       g      Activate the page number text field ("goto page").

       0      Set the zoom factor to 125%.

       +      Zoom in (increment the zoom factor by 1).

       -      Zoom out (decrement the zoom factor by 1).

       z      Set the zoom factor to 'page' (fit page to window).

       w      Set the zoom factor to 'width' (fit page width to window).

       alt-F  Toggle full-screen mode.

       q      Quit xpdf.

                                                                            ()

2 WEB_BROWSERS

       If  you  want  to  run  xpdf automatically from netscape or mosaic (and
       probably other browsers) when you click on a link to a  PDF  file,  you
       need  to  edit  (or  create) the files .mime.types and .mailcap in your
       home directory.  In .mime.types add the line:

              application/pdf pdf

       In .mailcap add the lines:

              # Use xpdf to view PDF files.
              application/pdf; xpdf -q %s

       Make sure that xpdf is on your executable search path.

       When you click on a URL link in a PDF file, xpdf will execute the  com-
       mand  specified  by  the  urlCommand  config  file option, replacing an
       occurrence of '%s' with the URL.  For example, to  call  netscape  with
       the URL, add this line to your config file:

              urlCommand "netscape -remote 'openURL(%s)'"

                                                                            ()

2 COMMANDS

       Xpdf's key and mouse bindings are user-configurable, using the bind and
       unbind options in the config file (see xpdfrc(5)).   The  bind  command
       allows  you  to bind a key or mouse button to a sequence of one or more
       commands.

   Available Commands
       The following commands are supported:

       gotoPage(page)
              Go to the specified page.

       gotoPageNoScroll(page)
              Go to the specified page, with the current relative scroll posi-
              tion.

       gotoDest(dest)
              Go to a named destination.

       gotoLastPage
              Go to the last page in the PDF file.

       gotoLastPageNoScroll
              Go  to  the last page in the PDF file, with the current relative
              scroll position.

       nextPage
              Go to the next page.

       nextPageNoScroll
              Go to the next page, with the current relative scroll  position.

       prevPage
              Go to the previous page.

       prevPageNoScroll
              Go  to the previous page, with the current relative scroll posi-
              tion.

       pageUp Scroll up by one screenful.

       pageDown
              Scroll down by one screenful.

       scrollLeft(n)
              Scroll left by n pixels.

       scrollRight(n)
              Scroll right by n pixels.

       scrollUp(n)
              Scroll up by n pixels.

       scrollDown(n)
              Scroll down by n pixels.

       scrollUpPrevPage(n)
              Scroll up by n pixels, moving to the previous page if  appropri-
              ate.

       scrollDownPrevPage(n)
              Scroll down by n pixels, moving to the next page if appropriate.

       scrollToTopEdge
              Scroll to the top edge of the current page, with  no  horizontal
              movement.

       scrollToBottomEdge
              Scroll  to the bottom edge of the current page, with no horizon-
              tal movement.

       scrollToLeftEdge
              Scroll to the left edge of the current page,  with  no  vertical
              movement.

       scrollToRightEdge
              Scroll  to  the right edge of the current page, with no vertical
              movement.

       scrollToTopLeft
              Scroll to the top-left corner of the current page.

       scrollToBottomRight
              Scroll to the bottom-right corner of the current page.

       goForward
              Move forward along the history path.

       goBackward
              Move backward along the history path.

       zoomPercent(z)
              Set the zoom factor to z%.

       zoomFitPage
              Set the zoom factor to fit-page.

       zoomFitWidth
              Set the zoom factor to fit-width.

       zoomIn Zoom in - go to the next higher zoom factor.

       zoomOut
              Zoom out - go the next lower zoom factor.

       rotateCW
              Rotate the page 90 degrees clockwise.

       rotateCCW
              Rotate the page 90 degrees counterclockwise.

       setSelection(pg,ulx,uly,lrx,lry)
              Set the selection to the specified coordinates on the  specified
              page.

       continuousMode
              Go to continuous view mode.

       singlePageMode
              Go to single-page view mode.

       toggleContinuousMode
              Toggle between continuous and single page view modes.

       fullScreenMode
              Go to full-screen mode.

       windowMode
              Go to window (non-full-screen) mode.

       toggleFullScreenMode
              Toggle between full-screen and window modes.

       open   Open a PDF file in this window, using the open dialog.

       openInNewWin
              Open a PDF file in a new window, using the open dialog.

       openFile(file)
              Open a specified PDF file in this window.

       openFileInNewWin(file)
              Open a specified PDF file in a new window.

       openFileAtDest(file,dest)
              Open  a specified PDF file in this window and go to a named des-
              tination.

       openFileAtDestInNewWin(file,dest)
              Open a specified PDF file in a new window and go to a named des-
              tination.

       reload Reload the current PDF file.

       redraw Redraw the window.

       raise  Raise the window to the front.

       closeWindow
              Close the window.

       run(external-command-string)
              Run  an  external command.  The following escapes are allowed in
              the command string:

                  %f => PDF file name (or an empty string if no
                        file is open)
                  %b => PDF file base name, i.e., file name minus
                        the extension (or an empty string if no
                        file is open)
                  %u => link URL (or an empty string if not over
                        a URL link)
                  %p => current page number (or an empty string if
                        no file is open)
                  %x => selection upper-left x coordinate
                        (or 0 if there is no selection)
                  %y => selection upper-left y coordinate
                        (or 0 if there is no selection)
                  %X => selection lower-right x coordinate
                        (or 0 if there is no selection)
                  %Y => selection lower-right y coordinate
                        (or 0 if there is no selection)
                  %% => %

       openOutline
              Open the outline pane.

       closeOutline
              Close the outline pane.

       toggleOutline
              Toggle the outline pane between open and closed.

       scrollOutlineDown(n)
              Scroll the outline down by n increments.

       scrollOutlineUp(n)
              Scroll the outline up by n increments.

       focusToDocWin
              Set the keyboard focus to the main document window.

       focusToPageNum
              Set the keyboard focus to the page number text box.

       find   Open the 'find' dialog.

       findNext
              Finds the next occurrence of the search string (no dialog).

       print  Open the 'print' dialog.

       about  Open the 'about' dialog.

       quit   Quit from xpdf.

       The following commands depend on the current mouse position:

       startSelection
              Start a selection, which will be extended as the mouse moves.

       endSelection
              End a selection.

       startPan
              Start a pan, which will scroll the document as the mouse moves

       endPan End a pan.

       postPopupMenu
              Display the popup menu.

       followLink
              Follow a hyperlink (does nothing if the  mouse  is  not  over  a
              link).

       followLinkInNewWin
              Follow  a  hyperlink,  opening  PDF  files in a new window (does
              nothing if the mouse is not over a link).  For links to  non-PDF
              files, this command is identical to followLink.

       followLinkNoSel
              Same  as  followLink,  but  does nothing if there is a non-empty
              selection.  (This is useful as a mouse button binding.)

       followLinkInNewWinNoSel
              Same as followLinkInNewWin, but does nothing if there is a  non-
              empty selection.  (This is useful as a mouse button binding.)

   Default Bindings
       The default mouse bindings are as follows:

           bind mousePress1    any         startSelection
           bind mouseRelease1  any         endSelection followLinkNoSel
           bind mousePress2    any         startPan
           bind mouseRelease2  any         endPan
           bind mousePress3    any         postPopupMenu
           bind mousePress4    any         scrollUpPrevPage(16)
           bind mousePress5    any         scrollDownNextPage(16)
           bind mousePress6    any         scrollLeft(16)
           bind mousePress7    any         scrollRight(16)

       The default key bindings are as follows:

           bind ctrl-home      any         gotoPage(1)
           bind home           any         scrollToTopLeft
           bind ctrl-end       any         gotoLastPage
           bind end            any         scrollToBottomRight
           bind pgup           any         pageUp
           bind backspace      any         pageUp
           bind delete         any         pageUp
           bind pgdn           any         pageDown
           bind space          any         pageDown
           bind left           any         scrollLeft(16)
           bind right          any         scrollRight(16)
           bind up             any         scrollUp(16)
           bind down           any         scrollDown(16)
           bind o              any         open
           bind O              any         open
           bind r              any         reload
           bind R              any         reload
           bind f              any         find
           bind F              any         find
           bind ctrl-f         any         find
           bind ctrl-g         any         findNext
           bind ctrl-p         any         print
           bind n              scrLockOff  nextPage
           bind N              scrLockOff  nextPage
           bind n              scrLockOn   nextPageNoScroll
           bind N              scrLockOn   nextPageNoScroll
           bind p              scrLockOff  prevPage
           bind P              scrLockOff  prevPage
           bind p              scrLockOn   prevPageNoScroll
           bind P              scrLockOn   prevPageNoScroll
           bind v              any         goForward
           bind b              any         goBackward
           bind g              any         focusToPageNum
           bind 0              any         zoomPercent(125)
           bind +              any         zoomIn
           bind -              any         zoomOut
           bind z              any         zoomFitPage
           bind w              any         zoomFitWidth
           bind alt-f          any         toggleFullScreenMode
           bind ctrl-l         any         redraw
           bind ctrl-w         any         closeWindow
           bind ?              any         about
           bind q              any         quit
           bind Q              any         quit

       Previous  versions  of  xpdf  included a "viKeys" X resource.  It is no
       longer available, but the following bindings are equivalent:

           bind h any scrollLeft(16)
           bind l any scrollRight(16)
           bind k any scrollUp(16)
           bind j any scrollDown(16)

                                                                            ()

2 REMOTE_SERVER_MODE

       Xpdf  can  be started in remote server mode by specifying a server name
       (in addition to the file name and page number).  For example:

              xpdf -remote myServer file.pdf

       If there is currently no xpdf running in  server  mode  with  the  name
       'myServer', a new xpdf window will be opened.  If another command:

              xpdf -remote myServer another.pdf 9

       is  issued, a new copy of xpdf will not be started.  Instead, the first
       xpdf (the server) will load another.pdf and display page nine.  If  the
       file name is the same:

              xpdf -remote myServer another.pdf 4

       the xpdf server will simply display the specified page.

       The -raise option tells the server to raise its window; it can be spec-
       ified with or without a file name and page number.

       The -quit option tells the server to close its window and exit.

                                                                            ()

2 XIT_CODE

       The Xpdf tools use the following exit codes:

       0      No error.

       1      Error opening a PDF file.

       2      Error opening an output file.

       3      Error related to PDF permissions.

       99     Other error.

                                                                            ()

2 AUTHOR

       The  xpdf  software  and  documentation are copyright 1996-2007 Glyph &
       Cog, LLC.

                                                                            ()

2 SEE_ALSO

       pdftops(1),  pdftotext(1), pdfinfo(1), pdffonts(1), pdftoppm(1), pdfim-
       ages(1), xpdfrc(5)
       http://www.foolabs.com/xpdf/

                                                                            ()

